<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">% 表題  2 次元非弾性流体モデル deepconv-mars 解説: 数値コード編
%       変数及び物理定数群の定義
%
% 履歴  1998/07/02  小高正嗣
%       1998/08/28  小高正嗣
%       1999/01/16  小高正嗣
%       1999/06/14  小高正嗣
%       2001/11/01  小高正嗣
%
\subsection{変数及び物理定数群の定義}

\subsubsection*{基本場の変数}

\begin{quote}
  \begin{tabular}{llll}
    {\tt ZGRID} &amp; (実数) &amp; {\tt ( -2:NZB )} &amp; 鉛直方向格子点座標 \\
    {\tt TEMP0} &amp; (実数) &amp; {\tt ( -2:NZB )} &amp; 基本場の温度 \\
    {\tt TPOT0} &amp; (実数) &amp; {\tt ( -2:NZB )} &amp; 基本場の温位 \\
    {\tt DENS0} &amp; (実数) &amp; {\tt ( -2:NZB )} &amp; 基本場の密度 \\
    {\tt PPAI0} &amp; (実数) &amp; {\tt ( -2:NZB )} &amp; 基本場の無次元圧力関数 \\
    {\tt PRES0} &amp; (実数) &amp; {\tt ( -2:NZB )} &amp; 基本場の圧力 \\
    {\tt RVAP0} &amp; (実数) &amp; {\tt ( -2:NZB )} &amp;  \\
    {\tt QVAP0} &amp; (実数) &amp; {\tt ( -2:NZB )} &amp; 基本場の水蒸気混合比 \\
                &amp;        &amp;                  &amp;  \\    
    {\tt FCOLI} &amp; (実数) &amp; {\tt ( -2:NXB )} &amp; コリオリ定数 \\
    {\tt TSFC}  &amp; (実数) &amp; {\tt ( -2:NXB )} &amp; 地表面温度 \\
    {\tt QVSFC} &amp; (実数) &amp; {\tt ( -2:NXB )} &amp; 地表面水蒸気混合比 \\
                &amp;        &amp;                  &amp;  \\    
    {\tt FDZ}   &amp; (実数) &amp; {\tt ( -2:NZB )} &amp; z 方向格子間隔 \\
    {\tt FDZM}  &amp; (実数) &amp; {\tt ( -2:NZB )} &amp; z 方向半整数格子間隔
  \end{tabular}
\end{quote}
%---------------------------------------------------------------------
\subsubsection*{圧力方程式ルーチン用作業配列}

\begin{quote}
  \begin{tabular}{llll}
    {\tt VMODE} &amp; (実数) &amp; {\tt ( -2:NZB, NZ )} &amp; 鉛直方向固有ベクトル行列\\
    {\tt TMODE} &amp; (実数) &amp; {\tt ( -2:NZB, NZ )} &amp; {\tt VMODE} の逆行列\\
    {\tt VEIGEN}&amp; (実数) &amp; {\tt ( NZ )}     &amp; 鉛直方向固有値\\
    {\tt FMODE} &amp; (実数) &amp; {\tt ( -2:NXB, NZ )} &amp; 水平方向係数逆行列\\
                &amp;        &amp;                  &amp;  \\    
    {\tt TRIGS} &amp; (実数) &amp; {\tt ( NX+15 )} &amp; \\
    {\tt IFAC}  &amp; (実数) &amp; {\tt ( 15 )} &amp; 
  \end{tabular}
\end{quote}
\newpage
%---------------------------------------------------------------------
\subsubsection*{予報変数}

\begin{quote}
  \begin{tabular}{llll}
    {\tt U}    &amp; (実数) &amp; {\tt ( -2:NXB, -2:NZB, NROT )} &amp; 風速 x 成分 \\
    {\tt V}    &amp; (実数) &amp; {\tt ( -2:NXB, -2:NZB, NROT )} &amp; 風速 y 成分 \\
    {\tt W}    &amp; (実数) &amp; {\tt ( -2:NXB, -2:NZB, NROT )} &amp; 風速 z 成分 \\
    {\tt PPAI} &amp; (実数) &amp; {\tt ( -2:NXB, -2:NZB, NROT )} &amp; 無次元圧力関数 \\
    {\tt TPOT} &amp; (実数) &amp; {\tt ( -2:NXB, -2:NZB, NROT )} &amp; 温位 \\
    {\tt QVAP} &amp; (実数) &amp; {\tt ( -2:NXB, -2:NZB, NROT )} &amp; 水蒸気混合比 \\
    {\tt QCLW} &amp; (実数) &amp; {\tt ( -2:NXB, -2:NZB, NROT )} &amp; 雲水混合比 \\
    {\tt QRAI} &amp; (実数) &amp; {\tt ( -2:NXB, -2:NZB, NROT )} &amp; 雨水混合比 \\
    {\tt CDTURB}&amp; (実数) &amp;{\tt ( -2:NXB, -2:NZB, NROT )} &amp; 乱流拡散係数 \\
    &amp; &amp; &amp; \\
    {\tt CDRAGV}&amp; (実数) &amp; {\tt ( -2:NXB )} &amp; バルク係数 \\
    {\tt RICHD} &amp; (実数) &amp; {\tt ( -2:NXB )} &amp; バルクリチャードソン数
  \end{tabular}
\end{quote}

%---------------------------------------------------------------------
\subsubsection*{診断変数}

\begin{quote}
  \begin{tabular}{llll}
    {\tt NZPROF} &amp; (整数) &amp;                 &amp; 水平平均量次元数\\
    {\tt NMZPROF} &amp; (文字) &amp; {\tt ( NZPROF )} &amp; 出力ファイル内ヘッダー \\
    {\tt ZPROF}&amp; (実数) &amp; {\tt ( -2:NZB, NZPROF )} &amp;  各種水平平均量 \\
    {\tt AXU}  &amp; (実数) &amp; {\tt ( -2:NZB )} &amp; 風速 x 成分(水平平均) \\
    {\tt AXV}  &amp; (実数) &amp; {\tt ( -2:NZB )} &amp; 風速 y 成分(水平平均) \\
    {\tt AXW}  &amp; (実数) &amp; {\tt ( -2:NZB )} &amp; 風速 z 成分(水平平均) \\
    {\tt AXTPOT} &amp; (実数) &amp; {\tt ( -2:NXB )} &amp; 温位(水平平均) \\
    {\tt AXMSE}  &amp; (実数) &amp; {\tt ( -2:NZB )} &amp;  \\
    {\tt AXQVAP} &amp; (実数) &amp; {\tt ( -2:NZB )} &amp; 水蒸気混合比(水平平均) \\
    {\tt AXQCLW} &amp; (実数) &amp; {\tt ( -2:NZB )} &amp; 雲水混合比(水平平均) \\
    {\tt AXQRAI} &amp; (実数) &amp; {\tt ( -2:NZB )} &amp; 雨水混合比(水平平均) \\
                 &amp;        &amp;                  &amp; \\
    {\tt IPQCLW} &amp; (実数) &amp; {\tt ( -2:NXB )} &amp; 地表面雲水量 \\
    {\tt IPQRAI} &amp; (実数) &amp; {\tt ( -2:NXB )} &amp; 地表面雨水量 \\
  \end{tabular}
\end{quote}
\begin{quote}
  \begin{tabular}{llll}
%                 &amp;        &amp;                  &amp; \\
    {\tt FUMON}  &amp; (実数) &amp; {\tt ( -2:NXB, 2 )} &amp; 地表面運動量フラックス \\
    {\tt FVMON}  &amp; (実数) &amp; {\tt ( -2:NXB, 2 )} &amp; 地表面運動量フラックス \\
    {\tt FHEAT}  &amp; (実数) &amp; {\tt ( -2:NXB, 2 )} &amp; 地表面熱フラックス \\
    {\tt FEVAP}  &amp; (実数) &amp; {\tt ( -2:NXB, 2 )} &amp; 地表面蒸発フラックス \\
    {\tt FWPREC} &amp; (実数) &amp; {\tt ( -2:NXB, 2 )} &amp; 地表面降水フラックス \\
                 &amp;        &amp;                  &amp; \\
    {\tt FUMONA} &amp; (実数) &amp; {\tt ( -2:NXB, 2 )} &amp; 地表面運動量フラックス
    (積算量)\\
    {\tt FVMONA} &amp; (実数) &amp; {\tt ( -2:NXB, 2 )} &amp; 地表面運動量フラックス
    (積算量)\\
    {\tt FHEATA} &amp; (実数) &amp; {\tt ( -2:NXB, 2 )} &amp; 地表面熱フラックス
    (積算量)\\
    {\tt FEVAPA} &amp; (実数) &amp; {\tt ( -2:NXB, 2 )} &amp; 地表面蒸発フラックス
    (積算量)\\
    {\tt FWPRECA}&amp; (実数) &amp; {\tt ( -2:NXB, 2 )} &amp; 地表面降水フラックス
    (積算量)
  \end{tabular}
\end{quote}

%---------------------------------------------------------------------
\subsubsection*{雲物理計算用作業配列}

\begin{quote}
  \begin{tabular}{llll}
    {\tt TPSTE}&amp; (実数) &amp; {\tt ( 75:175, 0:NZ )} &amp; \\
  \end{tabular}
\end{quote}

\subsubsection*{物理定数群}
  
%---------------------------------------------------------------------
\begin{quote}
  \begin{tabular}{ll}
    {\tt CONST1} &amp; 物理定数群
  \end{tabular}
  \begin{quote}
    \begin{tabular}{lll}
      {\tt GRAV}  &amp; (実数) &amp; 重力加速度 \\
      {\tt PSD}   &amp; (実数) &amp; 基準気圧 \\
      {\tt AMDRAY}&amp; (実数) &amp; 乾燥空気分子量 \\
      {\tt RDRY}  &amp; (実数) &amp; 乾燥空気気体定数 \\
      {\tt CPDRY} &amp; (実数) &amp; 乾燥空気定圧比熱 \\
      {\tt RMVAP} &amp; (実数) &amp; 湿潤空気分子量 \\
      {\tt ALATNT}&amp; (実数) &amp; 単位質量あたりの潜熱
    \end{tabular}
  \end{quote}

  \begin{tabular}{ll}
    {\tt MODEL} &amp; モデル記述定数群 
  \end{tabular}
  \begin{quote}
    \begin{tabular}{lll}
      {\tt NNX} &amp; (実数) &amp;  \\
      {\tt NNZ} &amp; (実数) &amp;  \\
      {\tt DDX} &amp; (実数) &amp;
    \end{tabular}
  \end{quote}

  \begin{tabular}{ll}
    {\tt CONST2} &amp; 地表面パラメータ群 
  \end{tabular}
  \begin{quote}
    \begin{tabular}{lll}
      {\tt CDRAG} &amp; (実数) &amp; 抵抗係数 \\
      {\tt VSFC0} &amp; (実数) &amp; 地表風速 \\
      {\tt PSFC}  &amp; (実数) &amp; 地表気圧 \\
      {\tt TSFC}  &amp; (実数) &amp; 地表面温度 \\
      {\tt QVSFC} &amp; (実数) &amp; 地表面水蒸気混合比 \\
      {\tt FCOLI} &amp; (実数) &amp; コリオリ力
    \end{tabular}
  \end{quote}
\end{quote}

</pre></body></html>