\hypertarget{ua__mpi__module__spectrum_8f90}{}\doxysection{ua\+\_\+mpi\+\_\+module/ua\+\_\+mpi\+\_\+module\+\_\+spectrum.f90 File Reference}
\label{ua__mpi__module__spectrum_8f90}\index{ua\_mpi\_module/ua\_mpi\_module\_spectrum.f90@{ua\_mpi\_module/ua\_mpi\_module\_spectrum.f90}}
\doxysubsection*{Modules}
\begin{DoxyCompactItemize}
\item 
module \mbox{\hyperlink{namespaceua__mpi__module__spectrum}{ua\+\_\+mpi\+\_\+module\+\_\+spectrum}}
\end{DoxyCompactItemize}
\doxysubsection*{Functions/\+Subroutines}
\begin{DoxyCompactItemize}
\item 
real(8) function, dimension(0\+:nm,-\/nm\+:nm, size(ua\+\_\+strfunc, 2)), public \mbox{\hyperlink{namespaceua__mpi__module__spectrum_a8b8ebd0b6a3645dc435447d5a93af6ac}{ua\+\_\+mpi\+\_\+module\+\_\+spectrum\+::nma\+\_\+energyfromstreamfunc\+\_\+ua}} (ua\+\_\+\+Strfunc)
\item 
real(8) function, dimension(0\+:nm, size(ua\+\_\+strfunc, 2)), public \mbox{\hyperlink{namespaceua__mpi__module__spectrum_aea9aa121f578244f45f313874fbed0b1}{ua\+\_\+mpi\+\_\+module\+\_\+spectrum\+::na\+\_\+energyfromstreamfunc\+\_\+ua}} (ua\+\_\+\+Strfunc)
\item 
real(8) function, dimension(0\+:nm,-\/nm\+:nm, size(ua\+\_\+strfunc, 2)), public \mbox{\hyperlink{namespaceua__mpi__module__spectrum_a1302b25d38f9ed99c6e1b6199db91056}{ua\+\_\+mpi\+\_\+module\+\_\+spectrum\+::nma\+\_\+enstrophyfromstreamfunc\+\_\+ua}} (ua\+\_\+\+Strfunc)
\item 
real(8) function, dimension(0\+:nm, size(ua\+\_\+strfunc, 2)), public \mbox{\hyperlink{namespaceua__mpi__module__spectrum_a9bc2351d8fa136eec74b3c4eaeb031fa}{ua\+\_\+mpi\+\_\+module\+\_\+spectrum\+::na\+\_\+enstrophyfromstreamfunc\+\_\+ua}} (ua\+\_\+\+Strfunc)
\end{DoxyCompactItemize}
\doxysubsection*{Variables}
\begin{DoxyCompactItemize}
\item 
real(8), public \mbox{\hyperlink{namespaceua__mpi__module__spectrum_aa0e061f3e289130166efea2a391a3400}{ua\+\_\+mpi\+\_\+module\+\_\+spectrum\+::ua\+\_\+spectrum\+\_\+vmiss}} = -\/999.\+000
\end{DoxyCompactItemize}
